<?xml version="1.0" encoding="utf-8"?>
<!DOCTYPE eagle SYSTEM "eagle.dtd">
<eagle version="9.3.0">
<drawing>
<schematic>
<libraries>
<library name="Duaa">
<packages>
<package name="MEGATHIN">
</package>
</packages>
<symbols>
<symbol name="ATMEGA328P-AU">
<pin name="VCC_2" direction="pwr"/>
<pin name="VCC" direction="pwr"/>
<pin name="AVCC" direction="pwr"/>
<pin name="ADC6" direction="in"/>
<pin name="ADC7" direction="in"/>
<pin name="AREF" direction="in"/>
<pin name="PB0"/>
<pin name="PB1"/>
<pin name="PB2"/>
<pin name="PB3"/>
<pin name="PB4"/>
<pin name="PB5"/>
<pin name="PB6"/>
<pin name="PB7"/>
<pin name="GND_2" direction="pas"/>
<pin name="GND_3" direction="pas"/>
<pin name="GND" direction="pas"/>
<pin name="PC0"/>
<pin name="PC1"/>
<pin name="PC2"/>
<pin name="PC3"/>
<pin name="PC4"/>
<pin name="PC5"/>
<pin name="PC6"/>
<pin name="PD0"/>
<pin name="PD1"/>
<pin name="PD2"/>
<pin name="PD3"/>
<pin name="PD4"/>
<pin name="PD5"/>
<pin name="PD6"/>
<pin name="PD7"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="ATMEGA328P-AU" prefix="U">
<gates>
<gate name="A" symbol="ATMEGA328P-AU"/>
</gates>
<devices>
<device name="MEGATHIN" package="MEGATHIN">
<connects>
<connect gate="A" pin="ADC6" pad="19"/>
<connect gate="A" pin="ADC7" pad="22"/>
<connect gate="A" pin="AREF" pad="20"/>
<connect gate="A" pin="AVCC" pad="18"/>
<connect gate="A" pin="GND" pad="3"/>
<connect gate="A" pin="GND_2" pad="5"/>
<connect gate="A" pin="GND_3" pad="21"/>
<connect gate="A" pin="PB0" pad="12"/>
<connect gate="A" pin="PB1" pad="13"/>
<connect gate="A" pin="PB2" pad="14"/>
<connect gate="A" pin="PB3" pad="15"/>
<connect gate="A" pin="PB4" pad="16"/>
<connect gate="A" pin="PB5" pad="17"/>
<connect gate="A" pin="PB6" pad="7"/>
<connect gate="A" pin="PB7" pad="8"/>
<connect gate="A" pin="PC0" pad="23"/>
<connect gate="A" pin="PC1" pad="24"/>
<connect gate="A" pin="PC2" pad="25"/>
<connect gate="A" pin="PC3" pad="26"/>
<connect gate="A" pin="PC4" pad="27"/>
<connect gate="A" pin="PC5" pad="28"/>
<connect gate="A" pin="PC6" pad="29"/>
<connect gate="A" pin="PD0" pad="30"/>
<connect gate="A" pin="PD1" pad="31"/>
<connect gate="A" pin="PD2" pad="32"/>
<connect gate="A" pin="PD3" pad="1"/>
<connect gate="A" pin="PD4" pad="2"/>
<connect gate="A" pin="PD5" pad="9"/>
<connect gate="A" pin="PD6" pad="10"/>
<connect gate="A" pin="PD7" pad="11"/>
<connect gate="A" pin="VCC" pad="4"/>
<connect gate="A" pin="VCC_2" pad="6"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
<library name="pinhead+">
<packages>
<package name="1X06">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X06/90">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X06_SMT">
</package>
<package name="1X11">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X11/90">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="1X11_SMT">
</package>
<package name="1X01">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
</packages>
<symbols>
<symbol name="PINHD6">
<pin name="1" direction="pas" function="dot"/>
<pin name="2" direction="pas" function="dot"/>
<pin name="3" direction="pas" function="dot"/>
<pin name="4" direction="pas" function="dot"/>
<pin name="5" direction="pas" function="dot"/>
<pin name="6" direction="pas" function="dot"/>
</symbol>
<symbol name="PINHD11">
<pin name="1" direction="pas" function="dot"/>
<pin name="2" direction="pas" function="dot"/>
<pin name="3" direction="pas" function="dot"/>
<pin name="4" direction="pas" function="dot"/>
<pin name="5" direction="pas" function="dot"/>
<pin name="6" direction="pas" function="dot"/>
<pin name="7" direction="pas" function="dot"/>
<pin name="8" direction="pas" function="dot"/>
<pin name="9" direction="pas" function="dot"/>
<pin name="10" direction="pas" function="dot"/>
<pin name="11" direction="pas" function="dot"/>
</symbol>
<symbol name="PINHD1">
<pin name="1" direction="pas" function="dot"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="PINHD-1X6" prefix="JP" uservalue="yes">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
<gates>
<gate name="A" symbol="PINHD6"/>
</gates>
<devices>
<device name="" package="1X06">
<connects>
<connect gate="A" pin="1" pad="1"/>
<connect gate="A" pin="2" pad="2"/>
<connect gate="A" pin="3" pad="3"/>
<connect gate="A" pin="4" pad="4"/>
<connect gate="A" pin="5" pad="5"/>
<connect gate="A" pin="6" pad="6"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="/90" package="1X06/90">
<connects>
<connect gate="A" pin="1" pad="1"/>
<connect gate="A" pin="2" pad="2"/>
<connect gate="A" pin="3" pad="3"/>
<connect gate="A" pin="4" pad="4"/>
<connect gate="A" pin="5" pad="5"/>
<connect gate="A" pin="6" pad="6"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1X06_SMT" package="1X06_SMT">
<connects>
<connect gate="A" pin="1" pad="1"/>
<connect gate="A" pin="2" pad="2"/>
<connect gate="A" pin="3" pad="3"/>
<connect gate="A" pin="4" pad="4"/>
<connect gate="A" pin="5" pad="5"/>
<connect gate="A" pin="6" pad="6"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="PINHD-1X11" prefix="JP" uservalue="yes">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
<gates>
<gate name="A" symbol="PINHD11"/>
</gates>
<devices>
<device name="" package="1X11">
<connects>
<connect gate="A" pin="1" pad="1"/>
<connect gate="A" pin="10" pad="10"/>
<connect gate="A" pin="11" pad="11"/>
<connect gate="A" pin="2" pad="2"/>
<connect gate="A" pin="3" pad="3"/>
<connect gate="A" pin="4" pad="4"/>
<connect gate="A" pin="5" pad="5"/>
<connect gate="A" pin="6" pad="6"/>
<connect gate="A" pin="7" pad="7"/>
<connect gate="A" pin="8" pad="8"/>
<connect gate="A" pin="9" pad="9"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="/90" package="1X11/90">
<connects>
<connect gate="A" pin="1" pad="1"/>
<connect gate="A" pin="10" pad="10"/>
<connect gate="A" pin="11" pad="11"/>
<connect gate="A" pin="2" pad="2"/>
<connect gate="A" pin="3" pad="3"/>
<connect gate="A" pin="4" pad="4"/>
<connect gate="A" pin="5" pad="5"/>
<connect gate="A" pin="6" pad="6"/>
<connect gate="A" pin="7" pad="7"/>
<connect gate="A" pin="8" pad="8"/>
<connect gate="A" pin="9" pad="9"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1X11_SMT" package="1X11_SMT">
<connects>
<connect gate="A" pin="1" pad="1"/>
<connect gate="A" pin="10" pad="10"/>
<connect gate="A" pin="11" pad="11"/>
<connect gate="A" pin="2" pad="2"/>
<connect gate="A" pin="3" pad="3"/>
<connect gate="A" pin="4" pad="4"/>
<connect gate="A" pin="5" pad="5"/>
<connect gate="A" pin="6" pad="6"/>
<connect gate="A" pin="7" pad="7"/>
<connect gate="A" pin="8" pad="8"/>
<connect gate="A" pin="9" pad="9"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="PINHD-1X1" prefix="JP" uservalue="yes">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
<gates>
<gate name="G$1" symbol="PINHD1"/>
</gates>
<devices>
<device name="" package="1X01">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
<library name="supply1">
<description>&lt;b&gt;Supply Symbols&lt;/b&gt;&lt;p&gt;
 GND, VCC, 0V, +5V, -5V, etc.&lt;p&gt;
 Please keep in mind, that these devices are necessary for the
 automatic wiring of the supply signals.&lt;p&gt;
 The pin name defined in the symbol is identical to the net which is to be wired automatically.&lt;p&gt;
 In this library the device names are the same as the pin names of the symbols, therefore the correct signal names appear next to the supply symbols in the schematic.&lt;p&gt;
 &lt;author&gt;Created by librarian@cadsoft.de&lt;/author&gt;</description>
<packages>
</packages>
<symbols>
<symbol name="GND">
<pin name="GND" direction="sup"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="GND" prefix="GND">
<description>&lt;b&gt;SUPPLY SYMBOL&lt;/b&gt;</description>
<gates>
<gate name="1" symbol="GND"/>
</gates>
<devices>
<device name="">
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
<library name="eagle_fab">
<packages>
<package name="LED1206">
<description>LED 1206 pads (standard pattern)</description>
</package>
<package name="LED1206FAB">
<description>LED1206 FAB style (smaller pads to allow trace between)</description>
</package>
<package name="5MM">
<description>5mm round through hole part.</description>
</package>
<package name="R1206">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;</description>
</package>
<package name="R1206W">
<description>&lt;b&gt;RESISTOR&lt;/b&gt;&lt;p&gt;
wave soldering</description>
</package>
<package name="R1206FAB">
</package>
<package name="C1206">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
<package name="C1206FAB">
</package>
<package name="C2220">
<description>&lt;b&gt;CAPACITOR&lt;/b&gt;</description>
</package>
<package name="1X06SMD">
</package>
<package name="6MM_SWITCH">
<description>&lt;b&gt;OMRON SWITCH&lt;/b&gt;</description>
</package>
<package name="2X03SMD">
</package>
<package name="2X03">
<description>&lt;b&gt;PIN HEADER&lt;/b&gt;</description>
</package>
<package name="USB_MINIB">
</package>
</packages>
<symbols>
<symbol name="LED">
<description>LED</description>
<pin name="C" direction="pas"/>
<pin name="A" direction="pas"/>
</symbol>
<symbol name="R-US">
<pin name="2" direction="pas"/>
<pin name="1" direction="pas"/>
</symbol>
<symbol name="CAP-NONPOLARIZED">
<description>non-polarized capacitor</description>
<pin name="1" direction="pas"/>
<pin name="2" direction="pas"/>
</symbol>
<symbol name="FTDI">
<pin name="GND"/>
<pin name="CTS"/>
<pin name="VCC"/>
<pin name="TXD"/>
<pin name="RXD"/>
<pin name="RTS"/>
</symbol>
<symbol name="TS2">
<pin name="P" direction="pas"/>
<pin name="S" direction="pas"/>
<pin name="S1" direction="pas"/>
<pin name="P1" direction="pas"/>
</symbol>
<symbol name="AVRISP">
<pin name="MISO" direction="pas" function="dot"/>
<pin name="VCC" direction="pas" function="dot"/>
<pin name="SCK" direction="pas" function="dot"/>
<pin name="MOSI" direction="pas" function="dot"/>
<pin name="RST" direction="pas" function="dot"/>
<pin name="GND" direction="pas" function="dot"/>
</symbol>
<symbol name="USB">
<pin name="D+"/>
<pin name="D-"/>
<pin name="VBUS"/>
<pin name="GND"/>
<pin name="SHIELD" direction="pas"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="LED">
<description>LED</description>
<gates>
<gate name="G$1" symbol="LED"/>
</gates>
<devices>
<device name="" package="LED1206">
<connects>
<connect gate="G$1" pin="A" pad="1"/>
<connect gate="G$1" pin="C" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="FAB1206" package="LED1206FAB">
<connects>
<connect gate="G$1" pin="A" pad="1"/>
<connect gate="G$1" pin="C" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="5MM" package="5MM">
<connects>
<connect gate="G$1" pin="A" pad="IN"/>
<connect gate="G$1" pin="C" pad="OUT"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="RES-US" prefix="R" uservalue="yes">
<description>&lt;b&gt;Resistor (US Symbol)&lt;/b&gt;
&lt;p&gt;
Variants with postfix FAB are widened to allow the routing of internal traces</description>
<gates>
<gate name="G$1" symbol="R-US"/>
</gates>
<devices>
<device name="1206" package="R1206">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206W" package="R1206W">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="1206FAB" package="R1206FAB">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="CAP-UNPOLARIZED" prefix="C" uservalue="yes">
<gates>
<gate name="&gt;NAME" symbol="CAP-NONPOLARIZED"/>
</gates>
<devices>
<device name="" package="C1206">
<connects>
<connect gate="&gt;NAME" pin="1" pad="1"/>
<connect gate="&gt;NAME" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="FAB" package="C1206FAB">
<connects>
<connect gate="&gt;NAME" pin="1" pad="1"/>
<connect gate="&gt;NAME" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="2220" package="C2220">
<connects>
<connect gate="&gt;NAME" pin="1" pad="1"/>
<connect gate="&gt;NAME" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="FTDI-SMD-HEADER">
<gates>
<gate name="G$1" symbol="FTDI"/>
</gates>
<devices>
<device name="" package="1X06SMD">
<connects>
<connect gate="G$1" pin="CTS" pad="2"/>
<connect gate="G$1" pin="GND" pad="1"/>
<connect gate="G$1" pin="RTS" pad="6"/>
<connect gate="G$1" pin="RXD" pad="5"/>
<connect gate="G$1" pin="TXD" pad="4"/>
<connect gate="G$1" pin="VCC" pad="3"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="6MM_SWITCH" prefix="S" uservalue="yes">
<description>&lt;b&gt;OMRON SWITCH&lt;/b&gt;</description>
<gates>
<gate name="2" symbol="TS2"/>
</gates>
<devices>
<device name="6MM_SWITCH" package="6MM_SWITCH">
<connects>
<connect gate="2" pin="P" pad="1"/>
<connect gate="2" pin="P1" pad="2"/>
<connect gate="2" pin="S" pad="3"/>
<connect gate="2" pin="S1" pad="4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="AVRISP">
<gates>
<gate name="G$1" symbol="AVRISP"/>
</gates>
<devices>
<device name="SMD" package="2X03SMD">
<connects>
<connect gate="G$1" pin="GND" pad="6"/>
<connect gate="G$1" pin="MISO" pad="1"/>
<connect gate="G$1" pin="MOSI" pad="4"/>
<connect gate="G$1" pin="RST" pad="5"/>
<connect gate="G$1" pin="SCK" pad="3"/>
<connect gate="G$1" pin="VCC" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="" package="2X03">
<connects>
<connect gate="G$1" pin="GND" pad="6"/>
<connect gate="G$1" pin="MISO" pad="1"/>
<connect gate="G$1" pin="MOSI" pad="4"/>
<connect gate="G$1" pin="RST" pad="5"/>
<connect gate="G$1" pin="SCK" pad="3"/>
<connect gate="G$1" pin="VCC" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
<deviceset name="USB_MINIB">
<gates>
<gate name="G$1" symbol="USB"/>
</gates>
<devices>
<device name="" package="USB_MINIB">
<connects>
<connect gate="G$1" pin="D+" pad="D+"/>
<connect gate="G$1" pin="D-" pad="D-"/>
<connect gate="G$1" pin="GND" pad="GND"/>
<connect gate="G$1" pin="SHIELD" pad="SHIELD@1 SHIELD@2 SHIELD@3 SHIELD@4"/>
<connect gate="G$1" pin="VBUS" pad="VBUS"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
<library name="IQD-Frequency-Products">
<description>&lt;b&gt;Crystals and Oscillators&lt;/b&gt;&lt;p&gt;
&lt;author&gt;Created by IQD Frequency Products&lt;/author&gt;</description>
<packages>
<package name="HC49">
<description>&lt;b&gt;IQD Frequency Products SIL Package&lt;/b&gt;</description>
</package>
<package name="HC49-4-HSMX">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="WATCH-3X8">
<description>&lt;b&gt;IQD Frequency Products SIL Package&lt;/b&gt;</description>
</package>
<package name="86SMX">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="85SMX">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="90SMX">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="91SMX">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="7.5X5-2-PAD">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="7.5X5-4-PAD">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="3.2X1.5-2-PAD">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
<package name="2.0X1.2-2PAD">
<description>&lt;b&gt;IQD Frequency Products SMD Package&lt;/b&gt;</description>
</package>
</packages>
<symbols>
<symbol name="CRYSTAL">
<pin name="2" direction="pas"/>
<pin name="1" direction="pas"/>
</symbol>
</symbols>
<devicesets>
<deviceset name="CRYSTALS-NOGND" prefix="X">
<description>&lt;b&gt;CRYSTALS CAN NOT GROUNDED&lt;/b&gt;</description>
<gates>
<gate name="G$1" symbol="CRYSTAL"/>
</gates>
<devices>
<device name="-HC49" package="HC49">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-4-HSMX" package="HC49-4-HSMX">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-WATCH-3X8" package="WATCH-3X8">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-86SMX" package="86SMX">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-85SMX" package="85SMX">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-90SMX" package="90SMX">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-91SMX" package="91SMX">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-12SMX-A" package="7.5X5-2-PAD">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-12SMX-B" package="7.5X5-4-PAD">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="4"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-CFPX-217" package="3.2X1.5-2-PAD">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-IQXC-25" package="2.0X1.2-2PAD">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
<device name="-HC49/4H" package="HC49">
<connects>
<connect gate="G$1" pin="1" pad="1"/>
<connect gate="G$1" pin="2" pad="2"/>
</connects>
<technologies>
<technology name=""/>
</technologies>
</device>
</devices>
</deviceset>
</devicesets>
</library>
</libraries>
<attributes>
</attributes>
<variantdefs>
</variantdefs>
<parts>
<part name="U1" library="Duaa" deviceset="ATMEGA328P-AU" device="MEGATHIN"/>
<part name="JP1" library="pinhead+" deviceset="PINHD-1X6" device="1X06_SMT"/>
<part name="U$1" library="eagle_fab" deviceset="LED" device=""/>
<part name="R1" library="eagle_fab" deviceset="RES-US" device="1206" value="560"/>
<part name="C1" library="eagle_fab" deviceset="CAP-UNPOLARIZED" device="" value="18P"/>
<part name="C2" library="eagle_fab" deviceset="CAP-UNPOLARIZED" device="" value="18P"/>
<part name="GND3" library="supply1" deviceset="GND" device=""/>
<part name="U$2" library="eagle_fab" deviceset="FTDI-SMD-HEADER" device=""/>
<part name="RESET_BUTTON" library="eagle_fab" deviceset="6MM_SWITCH" device="6MM_SWITCH"/>
<part name="U$3" library="eagle_fab" deviceset="AVRISP" device="SMD"/>
<part name="JP3" library="pinhead+" deviceset="PINHD-1X11" device="1X11_SMT"/>
<part name="C4" library="eagle_fab" deviceset="CAP-UNPOLARIZED" device="" value="100nF"/>
<part name="C5" library="eagle_fab" deviceset="CAP-UNPOLARIZED" device="" value="100nF"/>
<part name="R3" library="eagle_fab" deviceset="RES-US" device="1206" value="10K"/>
<part name="U$4" library="eagle_fab" deviceset="USB_MINIB" device=""/>
<part name="R2" library="eagle_fab" deviceset="RES-US" device="1206" value="0"/>
<part name="R4" library="eagle_fab" deviceset="RES-US" device="1206" value="0"/>
<part name="R5" library="eagle_fab" deviceset="RES-US" device="1206" value="0"/>
<part name="JP2" library="pinhead+" deviceset="PINHD-1X1" device=""/>
<part name="JP4" library="pinhead+" deviceset="PINHD-1X1" device=""/>
<part name="JP5" library="pinhead+" deviceset="PINHD-1X1" device=""/>
<part name="JP6" library="pinhead+" deviceset="PINHD-1X1" device=""/>
<part name="X1" library="IQD-Frequency-Products" deviceset="CRYSTALS-NOGND" device="-4-HSMX"/>
</parts>
<sheets>
<sheet>
<plain>
<text>Analog pins</text>
<text>crystal oscillator</text>
<text>FTDI</text>
<text>Digital Pins</text>
<text>Adding decoupling capacitor to VCC</text>
<text>Zahra Almukhariq - ID:201400300</text>
</plain>
<busses>
</busses>
<nets>
<net name="N$1">
<segment>
<pinref part="U1" gate="A" pin="PC0"/>
<pinref part="JP1" gate="A" pin="1"/>
</segment>
</net>
<net name="N$2">
<segment>
<pinref part="U1" gate="A" pin="PC1"/>
<pinref part="JP1" gate="A" pin="2"/>
</segment>
</net>
<net name="N$3">
<segment>
<pinref part="U1" gate="A" pin="PC2"/>
<pinref part="JP1" gate="A" pin="3"/>
</segment>
</net>
<net name="N$4">
<segment>
<pinref part="U1" gate="A" pin="PC3"/>
<pinref part="JP1" gate="A" pin="4"/>
</segment>
</net>
<net name="N$5">
<segment>
<pinref part="JP1" gate="A" pin="5"/>
<pinref part="U1" gate="A" pin="PC4"/>
</segment>
</net>
<net name="N$6">
<segment>
<pinref part="U1" gate="A" pin="PC5"/>
<pinref part="JP1" gate="A" pin="6"/>
</segment>
</net>
<net name="GND">
<segment>
<pinref part="C1" gate="&gt;NAME" pin="1"/>
<pinref part="C2" gate="&gt;NAME" pin="1"/>
<pinref part="GND3" gate="1" pin="GND"/>
</segment>
<segment>
<pinref part="U$3" gate="G$1" pin="GND"/>
</segment>
<segment>
<pinref part="U$2" gate="G$1" pin="GND"/>
</segment>
<segment>
<pinref part="C5" gate="&gt;NAME" pin="1"/>
<pinref part="C4" gate="&gt;NAME" pin="1"/>
</segment>
<segment>
<pinref part="U1" gate="A" pin="GND_2"/>
<pinref part="U1" gate="A" pin="GND_3"/>
<pinref part="U1" gate="A" pin="GND"/>
</segment>
<segment>
<pinref part="U$1" gate="G$1" pin="C"/>
</segment>
<segment>
<pinref part="RESET_BUTTON" gate="2" pin="S"/>
</segment>
<segment>
<pinref part="R2" gate="G$1" pin="1"/>
</segment>
<segment>
<pinref part="R2" gate="G$1" pin="2"/>
</segment>
<segment>
<pinref part="U$4" gate="G$1" pin="GND"/>
</segment>
<segment>
<pinref part="R4" gate="G$1" pin="1"/>
</segment>
<segment>
<pinref part="R4" gate="G$1" pin="2"/>
</segment>
<segment>
<pinref part="R5" gate="G$1" pin="2"/>
</segment>
<segment>
<pinref part="R5" gate="G$1" pin="1"/>
</segment>
<segment>
<pinref part="JP5" gate="G$1" pin="1"/>
</segment>
<segment>
<pinref part="JP6" gate="G$1" pin="1"/>
</segment>
</net>
<net name="VCC">
<segment>
<pinref part="U$3" gate="G$1" pin="VCC"/>
</segment>
<segment>
<pinref part="U$2" gate="G$1" pin="VCC"/>
</segment>
<segment>
<pinref part="R3" gate="G$1" pin="2"/>
</segment>
<segment>
<pinref part="U$4" gate="G$1" pin="VBUS"/>
</segment>
<segment>
<pinref part="U1" gate="A" pin="AREF"/>
<pinref part="C5" gate="&gt;NAME" pin="2"/>
<pinref part="C4" gate="&gt;NAME" pin="2"/>
<pinref part="R1" gate="G$1" pin="2"/>
<pinref part="U1" gate="A" pin="AVCC"/>
<pinref part="U1" gate="A" pin="VCC"/>
<pinref part="U1" gate="A" pin="VCC_2"/>
</segment>
<segment>
<pinref part="JP2" gate="G$1" pin="1"/>
</segment>
<segment>
<pinref part="JP4" gate="G$1" pin="1"/>
</segment>
</net>
<net name="N$9">
<segment>
<pinref part="R1" gate="G$1" pin="1"/>
<pinref part="U$1" gate="G$1" pin="A"/>
</segment>
</net>
<net name="N$10">
<segment>
<pinref part="C1" gate="&gt;NAME" pin="2"/>
<pinref part="U1" gate="A" pin="PB6"/>
<pinref part="X1" gate="G$1" pin="2"/>
</segment>
</net>
<net name="N$11">
<segment>
<pinref part="C2" gate="&gt;NAME" pin="2"/>
<pinref part="U1" gate="A" pin="PB7"/>
<pinref part="X1" gate="G$1" pin="1"/>
</segment>
</net>
<net name="SCK">
<segment>
<pinref part="U1" gate="A" pin="PB5"/>
</segment>
<segment>
<pinref part="U$3" gate="G$1" pin="SCK"/>
</segment>
</net>
<net name="TX">
<segment>
<pinref part="U$2" gate="G$1" pin="TXD"/>
</segment>
<segment>
<pinref part="U1" gate="A" pin="PD1"/>
</segment>
</net>
<net name="RX">
<segment>
<pinref part="U$2" gate="G$1" pin="RXD"/>
</segment>
<segment>
<pinref part="U1" gate="A" pin="PD0"/>
</segment>
</net>
<net name="MISO">
<segment>
<pinref part="U1" gate="A" pin="PB4"/>
</segment>
<segment>
<pinref part="U$3" gate="G$1" pin="MISO"/>
</segment>
</net>
<net name="MOSI">
<segment>
<pinref part="U1" gate="A" pin="PB3"/>
</segment>
<segment>
<pinref part="U$3" gate="G$1" pin="MOSI"/>
</segment>
</net>
<net name="RST">
<segment>
<pinref part="U1" gate="A" pin="PC6"/>
<pinref part="R3" gate="G$1" pin="1"/>
<pinref part="RESET_BUTTON" gate="2" pin="P"/>
</segment>
<segment>
<pinref part="U$2" gate="G$1" pin="RTS"/>
</segment>
<segment>
<pinref part="U$3" gate="G$1" pin="RST"/>
</segment>
</net>
<net name="N$12">
<segment>
<pinref part="U1" gate="A" pin="PD2"/>
<pinref part="JP3" gate="A" pin="1"/>
</segment>
</net>
<net name="N$13">
<segment>
<pinref part="U1" gate="A" pin="PD3"/>
<pinref part="JP3" gate="A" pin="2"/>
</segment>
</net>
<net name="N$14">
<segment>
<pinref part="U1" gate="A" pin="PD4"/>
<pinref part="JP3" gate="A" pin="3"/>
</segment>
</net>
<net name="N$15">
<segment>
<pinref part="U1" gate="A" pin="PD5"/>
<pinref part="JP3" gate="A" pin="6"/>
</segment>
</net>
<net name="N$16">
<segment>
<pinref part="U1" gate="A" pin="PD6"/>
<pinref part="JP3" gate="A" pin="7"/>
</segment>
</net>
<net name="N$17">
<segment>
<pinref part="U1" gate="A" pin="PD7"/>
<pinref part="JP3" gate="A" pin="8"/>
</segment>
</net>
<net name="N$18">
<segment>
<pinref part="U1" gate="A" pin="ADC6"/>
<pinref part="JP3" gate="A" pin="5"/>
</segment>
</net>
<net name="N$19">
<segment>
<pinref part="U1" gate="A" pin="ADC7"/>
<pinref part="JP3" gate="A" pin="4"/>
</segment>
</net>
<net name="N$20">
<segment>
<pinref part="U1" gate="A" pin="PB0"/>
<pinref part="JP3" gate="A" pin="9"/>
</segment>
</net>
<net name="N$21">
<segment>
<pinref part="U1" gate="A" pin="PB1"/>
<pinref part="JP3" gate="A" pin="10"/>
</segment>
</net>
<net name="N$22">
<segment>
<pinref part="JP3" gate="A" pin="11"/>
<pinref part="U1" gate="A" pin="PB2"/>
</segment>
</net>
</nets>
</sheet>
</sheets>
</schematic>
</drawing>
</eagle>
